<template>
  <div class="analyse-container">
    <div id="echartDiv" class="echartDiv100"></div>
  </div>
</template>

<script>
import { onMounted, reactive, ref, toRefs } from "vue";
import { ElMessage } from "element-plus";
import myApi from "@/api/myApi.js";
import BarEchart from "./BarEchart.vue";
import Process from "./Process.vue";
import Date from "@/components/Date.vue";
export default {
  name: "Analyse",
  components: {

  },
  setup() {
    const state = reactive({

    });
    onMounted(async () => {
      getChartsZfl("echartDiv", '蒸发量');
      getChartsZfl("echartDivQ", '蒸发带走的潜热')
    });
    const getChartsZfl = (id, text) => {
      var dom = document.getElementById(id);
      var op = {
        tooltip: {
          trigger: 'axis',
          axisPointer: {
            type: 'cross',
            crossStyle: {
              color: '#999'
            }
          }
        },
        legend: {
          data: ['系统A', '系统B', '系统C', '系统D', '系统E']
        },
        xAxis: [
          {
            type: 'category',
            data: [
              "00",
              "01",
              "02",
              "03",
              "04",
              "05",
              "06",
              "07",
              "08",
              "09",
              "10",
              "11",
              "12",
              "13",
              "14",
              "15",
              "16",
              "17",
              "18",
              "19",
              "20",
              "21",
              "22",
              "23",
            ],
            axisPointer: {
              type: 'shadow'
            }
          }
        ],
        yAxis: [
          {
            type: 'value',
            name: '热岛消减率A',
            min: 0,
            max: 250,
            interval: 50,
          },
          {
            type: 'value',
            name: '热岛消减率B',
            min: 0,
            max: 25,
            interval: 5,
          }
        ],
        series: [
          {
            name: '系统A',
            type: 'line',
            stack: 'one',
            data: [
              2.0, 4.9, 7.0, 23.2, 25.6, 76.7, 135.6, 162.2, 32.6, 20.0, 6.4, 3.3, 2.0, 4.9, 7.0, 23.2, 25.6, 76.7, 135.6, 162.2, 32.6, 20.0, 6.4, 3.3
            ]
          },
          {
            name: '系统B',
            type: 'line',
            stack: 'one',
            data: [
              2.6, 5.9, 9.0, 26.4, 28.7, 70.7, 175.6, 182.2, 48.7, 18.8, 6.0, 2.3, 2.6, 5.9, 9.0, 26.4, 28.7, 70.7, 175.6, 182.2, 48.7, 18.8, 6.0, 2.3
            ]
          },
          {
            name: '系统C',
            type: 'line',
            stack: 'one',
            data: [
              2.6, 5.9, 9.0, 26.4, 28.7, 70.7, 175.6, 182.2, 48.7, 18.8, 6.0, 2.3, 2.6, 5.9, 9.0, 26.4, 28.7, 70.7, 175.6, 182.2, 48.7, 18.8, 6.0, 2.3
            ]
          },
          {
            name: '系统D',
            type: 'line',
            stack: 'one',
            data: [
              2.6, 5.9, 9.0, 26.4, 28.7, 70.7, 175.6, 182.2, 48.7, 18.8, 6.0, 2.3, 2.6, 5.9, 9.0, 26.4, 28.7, 70.7, 175.6, 182.2, 48.7, 18.8, 6.0, 2.3
            ]
          },
          {
            name: '系统E',
            type: 'line',
            yAxisIndex: 1,
            data: [
              2.0, 2.2, 3.3, 4.5, 6.3, 10.2, 20.3, 23.4, 23.0, 16.5, 12.0, 6.2, 2.0, 2.2, 3.3, 4.5, 6.3, 10.2, 20.3, 23.4, 23.0, 16.5, 12.0, 6.2
            ]
          }
        ]
      };
      getEchart(dom, op)
    }
    const getEchart = (dom, op) => {
      if (dom) {
        var myChart = echarts.init(dom);
        var option = op;

        option && myChart.setOption(option);
      }
    };
    return {
      ...toRefs(state),
      getChartsZfl,
      getEchart
    };
  },
};
</script>

<style lang="scss" scoped>
.analyse-container {
  width: 100%;
  height: 100%;
  display: flex;
  flex-direction: column;
  justify-content: space-between;
  padding: 10px;

  .echartDiv100 {
    width: 100%;
    height: 100%;
    margin: 0 auto;
    // border: 1px solid red;
  }
}
</style>
